0.5

1

1.5

2

2.5

≥ Rivet 4.1.0,

(CDF_2009_I817466)

> 0.4 GeV) T | < 1, p

η(| _{ch} vs N T Average p

0 10 20 30 40

1

Ratio to CDF

2

0.5

2

0.5

1