7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210

CDF Pythia 8.315 default Pythia 8.315 tune-AU2 Pythia 8.315 tune-AU2lox Pythia 8.315 tune-AU2loxx Pythia 8.315 tune-AU2m

1800 GeV ppbar Underlying Event

mcplots.cern.ch [arXiv:1306.3436] 1.9M events ≥ Rivet 4.1.0,

(CDF_2001_I564673)

> 2.0 GeV) Tj1 (p spectrum Tp

0 2 4 6

1

Ratio to CDF

2

0.5

2

0.5

1