0 50 100 150 200 250 300 350 400 Pythia 8.315 default Pythia 8.315 tune-2c Pythia 8.315 tune-2m

7000 GeV pp Top (parton level)

mcplots.cern.ch [arXiv:1306.3436] 100k events≥

Rivet 4.1.0,

(MC_FBA_TTBAR)

(various cuts)

Cross section

0 5 10 15

1

Ratio to Pythia 8.315 default

2

0.5

2

0.5

1