0.2

0.4

0.6

0.8

1 CMS

Pythia 6.428 370 Pythia 6.428 391 Pythia 6.428 default Pythia 6.428 pro-q2o

7000 GeV pp NSD

mcplots.cern.ch [arXiv:1306.3436] 1.9M events ≥ Rivet 4.1.0,

(CMS_2011_I890166)

(NSD, |y| < 2)

/K0S vs |y| Λ

0 0.5 1 1.5 2

1

Ratio to CMS

2

0.5

2

0.5

1