[GeV] 1 TE

5−10

4−10

3−10

2−10

1−10

1

10

Fraction of events

CDF Pythia 6.425 default Pythia 8.244 default

1800 GeV ppbar Jets

mcplots.cern.ch [arXiv:1306.3436] 500k events≥

Rivet 4.1.0,

(CDF_1994_I374155)

of leading jet TE

100 200 300 400 [GeV] 1 TE

1

Ratio to CDF

2

0.5

2

0.5

1