0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 CMS

900 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436]

(CMS_2013_I1218372)

| < 2)

leadjet η | < 6.6, | η (5.2 < |

Forward Energy flow ratio

0 10 20

1

Ratio to CMS

2

0.5

2

0.5

1