0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

ATLAS

8000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:1306.3436]

(ATLAS_2016_I1467454)

< 150 GeV) ll (116 < m Zy

0 0.5 1 1.5 2

1

Ratio to ATLAS

2

0.5

2

0.5

1