[e] =0.6 κ L,1 Q

7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210

[1/e] 0.6 L,1 1/N dN/dQ

CMS Herwig++ 2.7.1 default Herwig 7.2.1 default Pythia 8.235 default Sherpa 2.2.9 default

8000 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 4.1.0,

(CMS_2017_I1605749)

< 1.5) η <1000 GeV, T CMS, 8 TeV, jetcharge of leading jet (700<p

0.5 − 0 0.5 [e] =0.6 κ L,1 Q

1

Ratio to CMS

2

0.5

2

0.5

1