2−10 1 210 410 610 810 10 10 12 10 14 10 16 10 18 10 19 10

Epos 1.99.crmc.1.6.0 lhc Herwig 7.2.1 default Pythia 6.427 370 Sherpa 2.2.9 default

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:2401.10621] 100k events≥

Rivet 4.1.0,

(MC_GAPS)

| < 5.2) η > 0.2 GeV, |

T(p

5− 0 5

1

Ratio to Epos 1.99.crmc.1.6.0 lhc

2

0.5

2

0.5

1