0

100

200

300

400

500 LHCB Pythia 6.428 370 Pythia 6.428 373 Pythia 6.428 374 Pythia 6.428 375 Pythia 6.428 381 Pythia 6.428 382

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 100k events≥

Rivet 4.1.0,

(LHCB_2013_I1208105)

> 3 GeV) T <4.9, p η (1.9<

Energy flow

2 3 4

1

Ratio to LHCB

2

0.5

2

0.5

1