E = 7 TeV

0

100

200

300

400

500

600

700

800 b]μ [ dy σd#

ALICE Pythia 6.428 370 Pythia 6.428 391 Pythia 6.428 default Pythia 8.210 default

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 100k events≥

Rivet 4.1.0,

(ALICE_2017_I1511870)

production (|y|<0.5). + for prompt D σ -integrated Tp

6999.5 7000 7000.5 E = 7 TeV

1

Ratio to ALICE

2

0.5

2

0.5

1