0

0.5

1

1.5

2

2.5

3

ATLAS Sherpa 1.3.0 default

7000 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] Rivet 4.1.0, 100k events

(ATLAS_2012_I1119557)

06) ak (atlas2012-pt300-js-m130

Jet Planar Flow

0 0.5 1

1

Ratio to ATLAS

2

0.5

2

0.5

1