0 1000

2000

3000

4000

5000

6000

7000

8000 CMS

7000 GeV pp bb

mcplots.cern.ch [arXiv:1306.3436]

(CMS_2011_I889807)

| <3)

Jlead η > 120 GeV, |

Jlead

(b-jets) (pT ϕΔ

0 1 2 3

1

Ratio to CMS

2

0.5

2

0.5

1