0 2 4 6 8 10 12 14 16 18

STAR Pythia 8.186 default

200 GeV pp Underlying Event

mcplots.cern.ch [arXiv:1306.3436] Rivet 3.1.10, 10M events

(STAR_2009_UE_HELEN)

10 20 30 40

1

Ratio to STAR

2

0.5

2

0.5

1