[GeV] Z Tp

2−10

1−10

1

10

210

[pb/(GeV)] Z Tdp^Zdy 2σd #

LHCB Herwig++ Powheg 2.7.1 default Sherpa 1.2.2p default

13000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:1306.3436] 300k events≥

Rivet 4.1.0,

(LHCB_2021_I1990313)

< 2.5 Z Double differential cross-section for 2.0 < y

0 100 200 [GeV] Z Tp

1

Ratio to LHCB

2

0.5

2

0.5

1