0 20 40 60 80 100 120 140 160 180 200 CMS Pythia 8.235 default Sherpa 1.4.5 default

13000 GeV pp Z+Jet

mcplots.cern.ch [arXiv:1306.3436] 100k events≥

Rivet 4.1.0,

(CMS_2021_I1866118)

(jets) (CMS Z+jets)

Tp_{rel}Δ

0 0.5 1

1

Ratio to CMS

2

0.5

2

0.5

1