]° [}}t/{_{{t}ϕ

3−10

2−10

1−10

}} t/{_{{t}ϕd σd # norm σ 1 #

CMS Sherpa 2.2.0 default

13000 GeV pp tt

mcplots.cern.ch [arXiv:1306.3436] Rivet 4.1.0, 100k events

(CMS_2021_I1901295)

+{jets} μ e/}t{

CMS, 13 TeV, {t}

0 50 100 150 ]° [}}t/{_{{t}ϕ

1

Ratio to CMS

2

0.5

2

0.5

1